`max_restore_bytes_per_sec`::

    Throttles per node restore rate. Defaults to unlimited.
    Note that restores are also throttled through {ref}/recovery.html[recovery settings].

`max_snapshot_bytes_per_sec`::

    Throttles per node snapshot rate. Defaults to `40mb` per second.

`readonly`::

    Makes repository read-only. Defaults to `false`.
