{es} 8.0+ requires Java 17 or later. {es} 8.13+ has been tested with https://www.bouncycastle.org/java.html[Bouncy Castle]'s Java 17
https://csrc.nist.gov/projects/cryptographic-module-validation-program/certificate/4616[certified] FIPS implementation and is the
recommended Java security provider when running {es} in FIPS 140-2 mode.
Note - {es} does not ship with a FIPS certified security provider and requires explicit installation and configuration.

Alternatively, consider using {ess} in the
https://www.elastic.co/industries/public-sector/fedramp[FedRAMP-certified GovCloud region].
